h x P E = 30000 μ = 0.25

P = 40 l = 48 h = 12

12 12 12 12

16 4 8 20

Regular mesh

Irregular mesh

4 × 1

z

4 × 1

Irregular mesh

6 6 6 6 6 6 6 6

6 6 7 7 4 4 5 5 8 8

8 8 2 2 4 4 10 10

8 × 2